; @(#)test.def 1.1   8/27/96

;******************************************************************************
; WinLib: a simple Windows 95 GUI library                                     *
; (C) Copyright 1996 by Philip Stephens                                       *
; (C) Copyright 1996 by the IBM Corporation                                   *
; All Rights Reserved                                                         *
;                                                                             *
; Permission to use, copy, modify, and distribute this software and its       *
; documentation without fee for any non-commerical purpose is hereby granted, *
; provided that the above copyright notice appears on all copies and that     *
; both that copyright notice and this permission notice appear in all         *
; supporting documentation.                                                   *
;                                                                             *
; NO REPRESENTATIONS ARE MADE ABOUT THE SUITABILITY OF THIS SOFTWARE FOR ANY  *
; PURPOSE.  IT IS PROVIDED "AS IS" WITHOUT EXPRESS OR IMPLIED WARRANTY.       *
; NEITHER PHILIP STEPHENS OR IBM SHALL BE LIABLE FOR ANY DAMAGES SUFFERED BY  *
; THE USE OF THIS SOFTWARE.                                                   *
;******************************************************************************

NAME test
DESCRIPTION 'Windows 95 test application'
